\section{basematrix}
\label{module_basematrix}
This module only contains factory methods

\subsection{basematrix factory methods}
\subsubsection{change_max_BaseMatrix_kbytes}
\begin{description}
\item[External C] {\tt Wise2_change_max_BaseMatrix_kbytes (new_kilo_number)}
\item[Perl] {\tt &Wise2::change_max_BaseMatrix_kbytes (new_kilo_number)}

\end{description}
Arguments
\begin{description}
\item[new_kilo_number] [UNKN ] max kilobytes allowed [int]
\item[returns] Nothing - no return value
\end{description}
This is to change, at run-time the maximum level of bytes basematrix *thinks*
it can use. This number is *not* used for any actual calls to basematrix
allocation: it is only used with /get_max_BaseMatrix_kbytes


\subsubsection{get_max_BaseMatrix_kbytes}
\begin{description}
\item[External C] {\tt Wise2_get_max_BaseMatrix_kbytes (void)}
\item[Perl] {\tt &Wise2::get_max_BaseMatrix_kbytes ()}

\end{description}
Arguments
\begin{description}
\item[returns] [UNKN ] Undocumented return value [int]
\end{description}
returns the max. number of kilobytes suggested as a limited
to BaseMatrix. 




