\section{randommodel}
\label{module_randommodel}
This module contains the following objects

\begin{itemize}
\item \ref{object_RandomModelDNA} RandomModelDNA

\item \ref{object_RandomModel} RandomModel

\item This module also contains some factory methods
\end{itemize}
\subsection{randommodel factory methods}
\subsubsection{RandomModelDNA_std}
\begin{description}
\item[External C] {\tt Wise2_RandomModelDNA_std (void)}
\item[Perl] {\tt &Wise2::RandomModelDNA_std ()}

\end{description}
Arguments
\begin{description}
\item[returns] [UNKN ] Undocumented return value [RandomModelDNA *]
\end{description}
Returns a structure with 0.25 set in each place


\subsubsection{default_RandomModel}
\begin{description}
\item[External C] {\tt Wise2_default_RandomModel (void)}
\item[Perl] {\tt &Wise2::default_RandomModel ()}

\end{description}
Arguments
\begin{description}
\item[returns] [UNKN ] Undocumented return value [RandomModel *]
\end{description}
Gives a default random model numbers from
swissprot34- via the HMMEr1 package




\subsection{Object RandomModelDNA}

\label{object_RandomModelDNA}

The RandomModelDNA object has the following fields. To see how to access them refer to \ref{accessing_fields}
\begin{description}
\item{base[5]} Type [Probability : Scalar] No documentation

\item{name} Type [char * : Scalar] No documentation

\end{description}
No documentation for RandomModelDNA

Member functions of RandomModelDNA

\subsection{Object RandomModel}

\label{object_RandomModel}

The RandomModel object has the following fields. To see how to access them refer to \ref{accessing_fields}
\begin{description}
\item{aminoacid[26]} Type [Probability : Scalar] No documentation

\item{name} Type [char * : Scalar] No documentation

\end{description}
No documentation for RandomModel

Member functions of RandomModel

