\documentstyle[12pt,greekfix]{myarticle}

\hoffset=-.5cm \voffset=-1cm
\textwidth 16.5cm \textheight 22.5cm
\topmargin -0.5in

\title{Fault Simulation Using Irsim}
\author{Arturo Salz \\
Computer Systems Laboratory \\
Stanford University
}

\begin{titlepage}

\end{titlepage}

\pagestyle{plain}

\begin{document}
\maketitle

\input{doc}
\end{document}

