;
; MTEST.DEF - def file for c-client test application mtest
;

NAME         mtest
DESCRIPTION  'C-Client Test Application'
;PROTMODE
;CODE           PRELOAD MOVEABLE DISCARDABLE
;DATA           PRELOAD MOVEABLE
