##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

rpl_ddl                  : BUG#26418 2007-03-01 mleich Slave out of sync after CREATE/DROP TEMPORARY TABLE + ROLLBACK on master
#rpl_innodb_mixed_ddl     : Bug #29363 rpl.rpl_innodb_mixed_* test failures
#rpl_innodb_mixed_dml     : Bug #29363 rpl.rpl_innodb_mixed_* test failures
rpl_invoked_features     : BUG#29020 2007-06-21 Lars Non-deterministic test case
rpl_auto_increment_11932   : Bug#29809 2007-07-16 ingo Slave SQL errors in warnings file
rpl_stm_extraColmaster_ndb : WL#3915 : Statement-based replication not supported in ndb. Enable test when supported.
rpl_row_extraColmaster_ndb : BUG#29549 : Replication of BLOBs fail for NDB
