;libpgtcl.def
; The LIBRARY entry must be same as the name of your DLL, the name of 
; our DLL is libpgtcl.dll
LIBRARY libpgtcl
EXPORTS 
   
       Pgtcl_Init  
       Pgtcl_SafeInit
