;----------------------------------------------------------------------
; FTNCHEK.DEF module definition file for OS/2
; Author:   J.Ftacnik, 1993
; Modified: Fabio Mariotti, March 1995, S. A. Deutscher, March 1996
;----------------------------------------------------------------------

NAME           FTNCHEK  WINDOWCOMPAT

DESCRIPTION    'OS2 version of FTNCHEK program'
PROTMODE
;----------------------------------------------------------------------
; commented out and given explicitly as 64 kB with a command line
; switch to the linker. 32 kB is too small on some settings and causes
; traps.  S. A. Deutscher
;----------------------------------------------------------------------
; STACKSIZE      0x8000

