110
5
0.5
0.0
12
1
2
0.0545454546809
0.5
1.0
46.7532463074
0.0
14.0259742737
0.0240259747952
0.886363625526
0.75
0.866883099079
0.75
0.0
0
0.75
16
10
2
2
1
5
0.10000000149
0.591228067875
a
1
0.688311696053
0.0
0.0
0.0
0.0
52.59740448
90.0
40.9090919495
0.0
0.0
0.0
0.0
0.00844155810773
2
