110
10
0.5
0.0
12
1
7
0.0805194824934
0.993506491184
1.0
28.0519809723
0.0
14.0259742737
0.0292207803577
0.75
0.75
0.847402572632
0.75
0.0714285671711
0
0.75
16
8
2
1
1
1
0.10000000149
0.205263152719
e
1
1.07233762741
0.0
90.0
0.103896103799
0.0
43.2467536926
90.0
54.9350662231
18.7012767792
0.0
0.0
0.0
0.0188311692327
9
