110
3
0.5
0.0
3
1
4
0.10000000149
1.0
1.0
46.7532463074
0.0
14.0259742737
0.0500000007451
0.568181812763
0.75
0.75
0.75
0.0
0
0.75
16
4
2
3
1
3
0.10000000149
0.15263158083
h
1
2.05974030495
0.0
0.0
0.0
0.0
52.59740448
90.0
40.9090919495
0.0
0.0
0.0
0.0
0.0500000007451
30
