110
4
0.5
0.0
8
1
6
0.10000000149
1.0
1.0
56.1039199829
0.0
0.00999999977648
0.0318181850016
0.5
0.75
0.840909063816
0.749999940395
0.0
0
0.75
16
9
2
2
1
2
0.10000000149
0.15263158083
g
1
1.68571436405
0.0
0.0
0.0
0.0
43.2467498779
90.0
47.922077179
0.0
0.0
0.0
0.0
0.0240259747952
30
