; $Header: /fridge/cvs/xscorch/data/profiles.def,v 1.4 2003/02/28 12:13:25 jacob Exp $
;
; profiles.def
; This is the default xscorch tank profile definition file.
;

Standard = tank_profile_class {
   radius      =  9;
   turretRadius=  13;
   shelfSize   =  5;
   mobile      =  true;

   row03    =  "       xxxxx       ";
   row04    =  "     xxxxxxxxx     ";
   row05    =  "    xxxxxxxxxxx    ";
   row06    =  "   xxx       xxx   ";
   row07    =  "  xxxxxxxxxxxxxxx  ";
   row08    =  " x   x       x   x ";
   row09    =  "  xxxxxxxxxxxxxxx  ";
};

DoubleTrack = tank_profile_class {
   radius      =  9;
   turretRadius=  13;
   shelfSize   =  4;
   efficiency  =  115;
   hardness    =  90;
   mobile      =  true;

   row03    =  "      xxxxxxx      ";
   row04    =  "    xxxxxxxxxxx    ";
   row05    =  "   xxxxxxxxxxxxx   ";
   row06    =  " x     xxxxx     x ";
   row07    =  "  xxxxx     xxxxx  ";
   row08    =  " x     x   x     x ";
   row09    =  "  xxxxx     xxxxx  ";
};

Fortification = tank_profile_class {
   radius      =  9;
   turretRadius=  13;
   shelfSize   =  6;
   hardness    =  125;
   mobile      =  false;

   row04    =  "        xxx        ";
   row05    =  "      xxxxxxx      ";
   row06    =  "     xxxxxxxxx     ";
   row07    =  "     xxxxxxxxx     ";
   row08    =  "    xxxxxxxxxxx    ";
   row09    =  "xxxxxxxxxxxxxxxxxxx";
};
