VCGDEMOMAKER ( 1l ) MISC. REFERENCE MANUAL PAGES VCGDEMOMAKER ( 1l )

NAME

vcgdemomaker – produces demo specifications for vcg

SYNOPSIS

vcgdemomaker outfile mode size

DESCRIPTION

Vcgdemomaker creates a vcg specification and writes it to outfile. The mode determines the v kind of specification and size the size of the specified graph. The specification can be read and isualized by the VCG tool.

MODI

-unarytree generates an unary tree, i.e. a linear sequence of nodes. size is the number of - nodes - 1, i.e. the depth of the tree.

binarytree generates a binary tree of depth size. Each node has two successors. - -ternarytree generates a ternary tree of depth size. Each node has 3 successors. leveltree generates a leveled tree of depth size. Each node has 2 normal successors, and . T further a list of nodes as successors at the same level to the left and right hese lists contain at most 2 nodes, which itself are leveled trees. These trees - are used to check the nearedge feature.

twolevelcross generates a cross graph. This is a bipartitioned graph of connected parts of 4 s g nodes forming a cross. Size is the number of nodes and should be even. Thi raph is generated in an ugly format to check the algorithm of reducing of - crossing in the VCG tool.

allconnect generates a graph where all pairs of node form an edge. Size is the number of l nodes. Note that if we have n nodes, we have about n∗n/2 edges which is a ot. Thus it is recommended not to use this with more than 40 nodes. . -netgraph generates a regular 4-ary network of triangular shape with about size nodes This mesh graph can be used to check the capacity of the tool, the view

-randomgraph mechanism and the algorithm of reducing of crossing in the VCG tool.

generates a randomized 4-ary network. Starting from the regular 4-ary network g r of triangular shape with about size nodes, this network is produced by creatin andom holes. Thus, this graph has less than size nodes. . - -net2graph generates a regular 4-ary network of rhomboid shape with about size nodes random2graph generates a randomized 4-ary network. Starting from the regular 4-ary network g r of rhomboid shape with about size nodes, this network is produced by creatin andom holes. Thus, this graph has less than size nodes.

SEE ALSO

vcg(l)

)

B

VCGDEMOMAKER ( 1l ) MISC. REFERENCE MANUAL PAGES VCGDEMOMAKER ( 1l

UGS Currently, no bugs are known.

AUTHOR

Georg Sander, University of Saarland.