%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%% Name:        splitpar.tex
%% Purpose:     wxSplitterRenderParams documentation
%% Author:      Vadim Zeitlin
%% Modified by:
%% Created:     11.08.03
%% RCS-ID:      $Id: splitpar.tex,v 1.5 2005/02/22 15:09:53 ABX Exp $
%% Copyright:   (c) 2003 Vadim Zeitlin <vadim@wxwindows.org>
%% License:     wxWindows license
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%


\section{\class{wxSplitterRenderParams}}\label{wxsplitterrenderparams}

This is just a simple {\tt struct} used as a return value of 
\helpref{wxRendererNative::GetSplitterParams}{wxrenderernativegetsplitterparams}.

It doesn't have any methods and all of its fields are constant and so can be
only examined but not modified.

\wxheading{Include files}

<wx/renderer.h>

\latexignore{\rtfignore{\wxheading{Members}}}

\membersection{wxEvent::widthSash}\label{wxeventwidthsash}

\member{const wxCoord}{widthSash}

The width of the splitter sash.


\membersection{wxSplitterRenderParams::border}\label{wxsplitterrenderparamsborder}

\member{const wxCoord}{border}

The width of the border drawn by the splitter inside it, may be $0$.


\membersection{wxSplitterRenderParams::isHotSensitive}\label{wxsplitterrenderparamsishotsensitive}

\member{const bool}{isHotSensitive}

\true if the sash changes appearance when the mouse passes over it, \false
otherwise.

